-10 -9 -8 -7 -6 -5 -4 -3 -10

-9

-8

-7

-6

-5

-4

-3

-2

log(Error) log|Cv-Cv0|

Specific heat: +:LFI, *:LCG, o:Wolff+LCG, x:Metro+LCG